\syntax{shutdown}

\begin{description}
Instructs the daemon to shut down as soon as possible.
\end{description}

\revision{1}
\perm{admin}

\begin{responses}
  \response{200}
  The daemon will shut down at its earliest convenience.
\end{responses}
